\begin{tabular}
Area&Departamento&Label&Seccional&Seccional 1998&Superficie\\
&ids&ids&ids&&\\
1.2705995E+07&01&DP 01 SP 1&SP 1&1&1271.67\\
8377348.0&01&DP 01 SP 2&SP 2&2&838.4388\\
4.5667594E+08&01&DP 01 SP 3&SP 3&3&45705.55\\
1.1038935E+09&01&DP 01 SP 4&SP 4&4&110510.3\\
1.3472118E+09&01&DP 01 SP 5&SP 5&5&134877.1\\
1.2023859E+09&01&DP 01 SP 6&SP 6&6&120396.2\\
5.2920112E+08&01&DP 01 SP 7&SP 7&7&52996.89\\
1.7774854E+09&01&DP 01 SP 8&SP 8&8&178003.5\\
2.0965618E+09&01&DP 01 SP 9&SP 9&9&209885.1\\
1.4235027E+09&01&DP 01 SP 10&SP 10&10&142485.5\\
1.6243820E+09&01&DP 01 SP 11&SP 11&11&162549.6\\
5.9173914E+08&01&DP 01 SP 12&SP 12&12&59229.82\\
2.7171261E+08&02&DP 02 SP 1&SP 1&1&27190.99\\
2.3423397E+08&02&DP 02 SP 2&SP 2&2&23441.09\\
2.8623946E+08&02&DP 02 SP 3&SP 3&3&28646.76\\
2.4777448E+07&02&DP 02 SP 4&SP 4&4&2479.551\\
3.3740376E+07&02&DP 02 SP 5&SP 5&5&3376.525\\
2.4015088E+08&02&DP 02 SP 6&SP 6&6&24030.38\\
2.4306698E+08&02&DP 02 SP 7&SP 7&7&24319.85\\
4.6608739E+08&02&DP 02 SP 8&SP 8&8&46627.74\\
3.7089341E+08&02&DP 02 SP 9&SP 9&9&37104.63\\
5.3744922E+08&02&DP 02 SP 10&SP 10&10&53770.34\\
2.4672664E+08&02&DP 02 SP 11&SP 11&11&24687.48\\
1.5670936E+08&02&DP 02 SP 12&SP 12&12&15680.13\\
2.1755837E+08&02&DP 02 SP 13&SP 13&13&21769.27\\
3.0760496E+08&02&DP 02 SP 14&SP 14&14&30776.32\\
1.8553211E+08&02&DP 02 SP 15&SP 15&15&18565.19\\
3.2879174E+07&02&DP 02 SP 16&SP 16&16&3289.942\\
4.8404416E+07&02&DP 02 SP 17&SP 17&17&4842.886\\
3.4549192E+07&02&DP 02 SP 18&SP 18&18&3457.012\\
6.5632676E+07&02&DP 02 SP 19&SP 19&19&6568.059\\
5.0311380E+07&02&DP 02 SP 20&SP 20&20&5034.402\\
8.5646976E+07&02&DP 02 SP 21&SP 21&21&8570.611\\
9.7275152E+07&02&DP 02 SP 22&SP 22&22&9732.798\\
1.1444538E+08&02&DP 02 SP 23&SP 23&23&11448.82\\
5.2076664E+07&02&DP 02 SP 24&SP 24&24&5210.171\\
2.1419036E+07&02&DP 02 SP 25&SP 25&25&2143.201\\
2.4860560E+07&02&DP 02 SP 26&SP 26&26&2487.604\\
6.4719660E+07&02&DP 02 SP 27&SP 27&27&6475.696\\
1.5923802E+07&03&DP 03 SP 1&SP 1&1&1591.791\\
1.7019126E+08&03&DP 03 SP 3&SP 3&3&17005.1\\
7.1151315E+08&03&DP 03 SP 4&SP 4&4&71115.73\\
1.7802898E+09&03&DP 03 SP 5&SP 5&5&177970.5\\
1.6135322E+09&03&DP 03 SP 6&SP 6&6&161326.5\\
9.0811328E+08&03&DP 03 SP 7&SP 7&7&90802.31\\
1.1659898E+09&03&DP 03 SP 8&SP 8&8&116596.1\\
1.9923137E+09&03&DP 03 SP 9&SP 9&9&199259.7\\
9.9874893E+08&03&DP 03 SP 10&SP 10&10&99838.42\\
9.1352634E+08&03&DP 03 SP 11&SP 11&11&91329.49\\
9.3019718E+08&03&DP 03 SP 12&SP 12&12&92968.66\\
1.1727931E+09&03&DP 03 SP 13&SP 13&13&117214.5\\
5.1800800E+08&03&DP 03 SP 14&SP 14&14&51781.18\\
7.6219366E+08&03&DP 03 SP 16&SP 16&16&76165.12\\
5935576.0&04&DP 04 SP 1&SP 1&1&594.4608\\
8.0457240E+07&04&DP 04 SP 2&SP 2&2&8055.961\\
5.3164584E+07&04&DP 04 SP 3&SP 3&3&5325.791\\
3.9341996E+07&04&DP 04 SP 4&SP 4&4&3941.334\\
1.4763269E+08&04&DP 04 SP 5&SP 5&5&14780.9\\
2.2939171E+08&04&DP 04 SP 6&SP 6&6&22967.13\\
3.8145210E+08&04&DP 04 SP 7&SP 7&7&38203.59\\
4.3800788E+07&04&DP 04 SP 8&SP 8&8&4385.796\\
4.7321366E+08&04&DP 04 SP 9&SP 9&9&47398.84\\
3.6493558E+08&04&DP 04 SP 10&SP 10&10&36554.98\\
4.2681216E+08&04&DP 04 SP 11&SP 11&11&42753.93\\
5.9046374E+08&04&DP 04 SP 12&SP 12&12&59138.44\\
6.7116858E+08&04&DP 04 SP 13&SP 13&13&67212.86\\
5.9441811E+08&04&DP 04 SP 14&SP 14&14&59524.8\\
4.6553776E+08&04&DP 04 SP 15&SP 15&15&46620.47\\
3.0809379E+08&04&DP 04 SP 16&SP 16&16&30850.11\\
6.0367680E+08&04&DP 04 SP 17&SP 17&17&60444.71\\
6.1984998E+08&04&DP 04 SP 18&SP 18&18&62058.42\\
1.4177727E+07&05&DP 05 SP 1&SP 1&1&1419.003\\
1.2391631E+09&05&DP 05 SP 2&SP 2&2&124019.4\\
6.0898067E+08&05&DP 05 SP 3&SP 3&3&60945.03\\
1.0486776E+09&05&DP 05 SP 4&SP 4&4&104938.0\\
1.4540283E+09&05&DP 05 SP 5&SP 5&5&145487.5\\
7.3066157E+08&05&DP 05 SP 6&SP 6&6&73098.46\\
1.3915805E+09&05&DP 05 SP 7&SP 7&7&139205.1\\
7.3606234E+08&05&DP 05 SP 8&SP 8&8&73622.77\\
1.6310529E+07&05&DP 05 SP 9&SP 9&9&1631.727\\
1.0488859E+09&05&DP 05 SP 10&SP 10&10&104944.8\\
9.6907802E+08&05&DP 05 SP 11&SP 11&11&96999.23\\
8.3359475E+08&05&DP 05 SP 12&SP 12&12&83445.94\\
6.4609254E+08&05&DP 05 SP 13&SP 13&13&64631.07\\
5.7986074E+08&05&DP 05 SP 14&SP 14&14&58007.99\\
1.9027003E+08&05&DP 05 SP 15&SP 15&15&19043.36\\
6309988.0&06&DP 06 SP 1&SP 1&1&631.6674\\
5.1078970E+08&06&DP 06 SP 2&SP 2&2&51133.32\\
1.1482872E+09&06&DP 06 SP 3&SP 3&3&114964.6\\
9.1900339E+08&06&DP 06 SP 4&SP 4&4&92003.81\\
4.7884822E+08&06&DP 06 SP 5&SP 5&5&47932.46\\
1.0820604E+09&06&DP 06 SP 6&SP 6&6&108309.5\\
2.8052829E+08&06&DP 06 SP 7&SP 7&7&28082.71\\
5.3106304E+08&06&DP 06 SP 8&SP 8&8&53153.25\\
1.4079768E+08&06&DP 06 SP 9&SP 9&9&14095.15\\
1.5909425E+07&07&DP 07 SP 1&SP 1&1&1592.081\\
3.0557891E+08&07&DP 07 SP 2&SP 2&2&30573.79\\
4.4971619E+08&07&DP 07 SP 3&SP 3&3&45006.7\\
8.2077888E+08&07&DP 07 SP 4&SP 4&4&82136.66\\
4.0394572E+07&07&DP 07 SP 5&SP 5&5&4042.742\\
4.9845027E+08&07&DP 07 SP 6&SP 6&6&49866.42\\
1.6520157E+08&07&DP 07 SP 7&SP 7&7&16532.1\\
1.2031235E+09&07&DP 07 SP 8&SP 8&8&120388.3\\
8.4870938E+08&07&DP 07 SP 9&SP 9&9&84921.52\\
1.1921664E+09&07&DP 07 SP 10&SP 10&10&119280.2\\
1.1708594E+09&07&DP 07 SP 11&SP 11&11&117130.9\\
1.1884471E+09&07&DP 07 SP 12&SP 12&12&118872.5\\
6.4315296E+08&07&DP 07 SP 13&SP 13&13&64365.49\\
1.2443752E+09&07&DP 07 SP 14&SP 14&14&124483.2\\
4.4197283E+08&07&DP 07 SP 15&SP 15&15&44228.51\\
1.5779938E+08&07&DP 07 SP 16&SP 16&16&15792.38\\
2.2096804E+07&08&DP 08 SP 1&SP 1&1&2210.175\\
4.1912384E+08&08&DP 08 SP 2&SP 2&2&41924.78\\
4.5217395E+08&08&DP 08 SP 3&SP 3&3&45228.23\\
5.9901837E+08&08&DP 08 SP 4&SP 4&4&59920.5\\
8.7387622E+08&08&DP 08 SP 5&SP 5&5&87402.98\\
9.5590534E+08&08&DP 08 SP 6&SP 6&6&95601.96\\
7.0519872E+08&08&DP 08 SP 7&SP 7&7&70523.79\\
1.3135502E+09&08&DP 08 SP 8&SP 8&8&131347.8\\
1.1564220E+09&08&DP 08 SP 9&SP 9&9&115632.2\\
8.6170458E+08&08&DP 08 SP 10&SP 10&10&86154.06\\
5.4808333E+08&08&DP 08 SP 11&SP 11&11&54809.93\\
8.6159136E+08&08&DP 08 SP 12&SP 12&12&86170.29\\
4.6060509E+08&08&DP 08 SP 13&SP 13&13&46076.39\\
8.2176595E+08&08&DP 08 SP 14&SP 14&14&82192.04\\
2.4256725E+08&09&DP 09 SP 1&SP 1&1&24259.39\\
1.8127376E+08&09&DP 09 SP 2&SP 2&2&18128.62\\
4.7892365E+08&09&DP 09 SP 3&SP 3&3&47902.59\\
6.6250893E+08&09&DP 09 SP 4&SP 4&4&66258.98\\
2.3204581E+08&09&DP 09 SP 5&SP 5&5&23211.46\\
4.8173005E+08&09&DP 09 SP 6&SP 6&6&48173.26\\
4.5855197E+08&09&DP 09 SP 7&SP 7&7&45851.21\\
8.6399264E+08&09&DP 09 SP 8&SP 8&8&86391.16\\
5.9108429E+08&09&DP 09 SP 9&SP 9&9&59105.52\\
3.4680240E+07&09&DP 09 SP 10&SP 10&10&3468.306\\
1.6519226E+08&09&DP 09 SP 11&SP 11&11&16522.83\\
2.5400752E+08&09&DP 09 SP 12&SP 12&12&25401.17\\
1.7707947E+08&09&DP 09 SP 13&SP 13&13&17706.49\\
1375350.0&10&DP 10 SP 1&SP 1&1&137.6324\\
1770383.0&10&DP 10 SP 2&SP 2&2&177.162\\
2194206.0&10&DP 10 SP 3&SP 3&3&219.5741\\
2929840.0&10&DP 10 SP 4&SP 4&4&293.1868\\
3115958.0&10&DP 10 SP 5&SP 5&5&311.8108\\
4730104.0&10&DP 10 SP 6&SP 6&6&473.3416\\
5505044.0&10&DP 10 SP 7&SP 7&7&550.895\\
1.0404681E+07&10&DP 10 SP 8&SP 8&8&1041.204\\
6261018.0&10&DP 10 SP 9&SP 9&9&626.528\\
4347777.0&10&DP 10 SP 10&SP 10&10&435.0742\\
5485368.0&10&DP 10 SP 11&SP 11&11&548.9014\\
1.1014538E+07&10&DP 10 SP 12&SP 12&12&1102.217\\
8544463.0&10&DP 10 SP 13&SP 13&13&855.0309\\
1.9502072E+07&10&DP 10 SP 14&SP 14&14&1951.455\\
6612680.0&10&DP 10 SP 15&SP 15&15&661.71\\
3.3971264E+07&10&DP 10 SP 16&SP 16&16&3399.362\\
6.3092964E+07&10&DP 10 SP 17&SP 17&17&6313.601\\
6.3082508E+07&10&DP 10 SP 18&SP 18&18&6312.347\\
2.3520464E+07&10&DP 10 SP 19&SP 19&19&2353.75\\
3.9802064E+07&10&DP 10 SP 20&SP 20&20&3983.35\\
4.9589296E+07&10&DP 10 SP 21&SP 21&21&4962.441\\
8.2035584E+07&10&DP 10 SP 22&SP 22&22&8209.733\\
5.0907164E+07&10&DP 10 SP 23&SP 23&23&5094.612\\
3.6011228E+07&10&DP 10 SP 24&SP 24&24&3603.805\\
1.0736671E+07&11&DP 11 SP 1&SP 1&1&1075.474\\
1.6010429E+07&11&DP 11 SP 2&SP 2&2&1603.756\\
9.2391032E+07&11&DP 11 SP 3&SP 3&3&9254.321\\
9.8727360E+08&11&DP 11 SP 4&SP 4&4&98883.75\\
9.4988973E+08&11&DP 11 SP 5&SP 5&5&95139.55\\
1.5349277E+09&11&DP 11 SP 6&SP 6&6&153737.4\\
1.5285487E+09&11&DP 11 SP 7&SP 7&7&153090.0\\
2.2592192E+09&11&DP 11 SP 8&SP 8&8&226223.9\\
1.9781696E+09&11&DP 11 SP 9&SP 9&9&198035.6\\
1.2829166E+09&11&DP 11 SP 10&SP 10&10&128399.8\\
1.2146173E+09&11&DP 11 SP 11&SP 11&11&121571.9\\
1.0613844E+09&11&DP 11 SP 12&SP 12&12&106261.4\\
1.0230730E+09&11&DP 11 SP 13&SP 13&13&102449.1\\
1.7760296E+07&12&DP 12 SP 1&SP 1&1&1779.194\\
1.1924183E+07&12&DP 12 SP 2&SP 2&2&1194.542\\
6.2078682E+08&12&DP 12 SP 3&SP 3&3&62186.78\\
5.9758918E+08&12&DP 12 SP 4&SP 4&4&59855.89\\
8.4199936E+08&12&DP 12 SP 5&SP 5&5&84338.56\\
4.3568205E+08&12&DP 12 SP 6&SP 6&6&43633.11\\
1.1841755E+09&12&DP 12 SP 7&SP 7&7&118576.6\\
8.9222829E+08&12&DP 12 SP 8&SP 8&8&89327.02\\
1.2929286E+09&12&DP 12 SP 9&SP 9&9&129421.3\\
1.4674287E+09&12&DP 12 SP 10&SP 10&10&146912.0\\
8.5983123E+08&12&DP 12 SP 11&SP 11&11&86095.16\\
1.0645750E+09&12&DP 12 SP 12&SP 12&12&106615.4\\
9010330.0&13&DP 13 SP 1&SP 1&1&901.3428\\
6.9405421E+08&13&DP 13 SP 2&SP 2&2&69434.32\\
1.5217560E+09&13&DP 13 SP 3&SP 3&3&152246.3\\
8.8231942E+08&13&DP 13 SP 4&SP 4&4&88253.99\\
1.4348524E+09&13&DP 13 SP 5&SP 5&5&143529.5\\
1.3408201E+09&13&DP 13 SP 6&SP 6&6&134097.1\\
1.2170697E+09&13&DP 13 SP 7&SP 7&7&121711.2\\
1.9248631E+09&13&DP 13 SP 8&SP 8&8&192462.0\\
1.7472570E+08&13&DP 13 SP 9&SP 9&9&17478.14\\
1.4389816E+08&13&DP 13 SP 10&SP 10&10&14395.39\\
1.6806212E+07&14&DP 14 SP 1&SP 1&1&1680.241\\
1.6749158E+09&14&DP 14 SP 2&SP 2&2&167404.2\\
1.6122284E+09&14&DP 14 SP 3&SP 3&3&161171.6\\
1.0504817E+09&14&DP 14 SP 4&SP 4&4&104999.0\\
1.9435622E+08&14&DP 14 SP 5&SP 5&5&19422.5\\
1.5936467E+09&14&DP 14 SP 6&SP 6&6&159280.8\\
5.0310445E+08&14&DP 14 SP 7&SP 7&7&50300.97\\
6.5300851E+08&14&DP 14 SP 8&SP 8&8&65278.04\\
6.4872550E+08&14&DP 14 SP 9&SP 9&9&64836.14\\
1.3591332E+09&14&DP 14 SP 10&SP 10&10&135876.7\\
3.5439238E+08&14&DP 14 SP 11&SP 11&11&35427.51\\
8.5912896E+08&14&DP 14 SP 12&SP 12&12&85894.66\\
7634604.0&15&DP 15 SP 1&SP 1&1&764.722\\
1.1714979E+07&15&DP 15 SP 2&SP 2&2&1173.413\\
1.0645137E+08&15&DP 15 SP 3&SP 3&3&10662.79\\
1.6766448E+08&15&DP 15 SP 4&SP 4&4&16793.28\\
4.3597152E+07&15&DP 15 SP 5&SP 5&5&4366.833\\
7.2091424E+08&15&DP 15 SP 6&SP 6&6&72199.38\\
1.1663322E+09&15&DP 15 SP 7&SP 7&7&116806.8\\
5.1978925E+08&15&DP 15 SP 8&SP 8&8&52055.28\\
9.5593427E+08&15&DP 15 SP 9&SP 9&9&95722.96\\
1.4644347E+09&15&DP 15 SP 10&SP 10&10&146609.1\\
1.2795991E+09&15&DP 15 SP 11&SP 11&11&128054.4\\
1.5432893E+09&15&DP 15 SP 12&SP 12&12&154456.0\\
1.7525942E+09&15&DP 15 SP 13&SP 13&13&175418.4\\
1.4553755E+09&15&DP 15 SP 14&SP 14&14&145690.0\\
1.3676489E+09&15&DP 15 SP 15&SP 15&15&136928.9\\
1.3886327E+09&15&DP 15 SP 16&SP 16&16&139042.0\\
6377304.0&16&DP 16 SP 1&SP 1&1&638.3395\\
8183268.0&16&DP 16 SP 2&SP 2&2&819.1149\\
3.7486141E+08&16&DP 16 SP 3&SP 3&3&37523.33\\
6.3498323E+08&16&DP 16 SP 4&SP 4&4&63565.61\\
7.8970643E+08&16&DP 16 SP 5&SP 5&5&79057.48\\
5.2014880E+08&16&DP 16 SP 6&SP 6&6&52067.35\\
4.3285718E+08&16&DP 16 SP 7&SP 7&7&43325.45\\
1.0489638E+09&16&DP 16 SP 8&SP 8&8&104987.0\\
1.0528874E+09&16&DP 16 SP 9&SP 9&9&105386.5\\
1.6416221E+08&16&DP 16 SP 10&SP 10&10&16429.82\\
1.0626719E+07&17&DP 17 SP 1&SP 1&1&1064.418\\
5385565.0&17&DP 17 SP 2&SP 2&2&539.4395\\
5.7073901E+08&17&DP 17 SP 3&SP 3&3&57165.71\\
1.0684200E+09&17&DP 17 SP 4&SP 4&4&107021.5\\
4.1697043E+08&17&DP 17 SP 5&SP 5&5&41770.74\\
1.1751387E+09&17&DP 17 SP 6&SP 6&6&117688.6\\
1.0463063E+09&17&DP 17 SP 7&SP 7&7&104784.1\\
1.2171259E+09&17&DP 17 SP 8&SP 8&8&121891.9\\
7.6249254E+08&17&DP 17 SP 9&SP 9&9&76380.39\\
8.1312102E+08&17&DP 17 SP 10&SP 10&10&81422.4\\
9.5430406E+08&17&DP 17 SP 11&SP 11&11&95549.44\\
8.1056454E+08&17&DP 17 SP 12&SP 12&12&81163.41\\
1.1385195E+07&18&DP 18 SP 1&SP 1&1&1139.181\\
7.7217824E+07&18&DP 18 SP 2&SP 2&2&7726.197\\
1.2492046E+08&18&DP 18 SP 3&SP 3&3&12503.17\\
9.9544365E+08&18&DP 18 SP 4&SP 4&4&99596.1\\
1.6488233E+09&18&DP 18 SP 5&SP 5&5&164985.9\\
4.8613130E+08&18&DP 18 SP 6&SP 6&6&48647.02\\
1.6976635E+09&18&DP 18 SP 7&SP 7&7&169804.3\\
1.2254318E+09&18&DP 18 SP 8&SP 8&8&122546.8\\
1.5344106E+09&18&DP 18 SP 9&SP 9&9&153502.7\\
7.0892806E+08&18&DP 18 SP 10&SP 10&10&70939.27\\
1.1169029E+09&18&DP 18 SP 11&SP 11&11&111768.2\\
9.1574259E+08&18&DP 18 SP 12&SP 12&12&91625.72\\
9.5757229E+08&18&DP 18 SP 13&SP 13&13&95815.43\\
1.1270062E+09&18&DP 18 SP 14&SP 14&14&112748.6\\
1.5176689E+09&18&DP 18 SP 15&SP 15&15&151790.5\\
1.3217161E+09&18&DP 18 SP 16&SP 16&16&132277.9\\
2.2688186E+07&19&DP 19 SP 1&SP 1&1&2268.282\\
7.0151942E+08&19&DP 19 SP 2&SP 2&2&70121.18\\
1.9509818E+09&19&DP 19 SP 3&SP 3&3&194980.6\\
1.1076247E+09&19&DP 19 SP 4&SP 4&4&110732.4\\
1.2510857E+09&19&DP 19 SP 5&SP 5&5&125095.4\\
1.2489733E+09&19&DP 19 SP 6&SP 6&6&124902.0\\
1.2329876E+09&19&DP 19 SP 7&SP 7&7&123266.2\\
4.2058698E+08&19&DP 19 SP 8&SP 8&8&42059.86\\
6.9505888E+08&19&DP 19 SP 9&SP 9&9&69478.43\\
1.3966648E+08&19&DP 19 SP 10&SP 10&10&13963.55\\
5.1945565E+08&19&DP 19 SP 11&SP 11&11&51929.81\\
\end{tabular}
